%\input mttim11
\font\tiny=phvr at 5pt
\font\puntenfont=phvr at 7pt
\font\werkbladbold=ptmb at 24pt
\font\werkbladregular=ptmr at 14pt
\font\fourteenbold=ptmb at 14pt
\font\thirteenbold=ptmb at 13pt
\font\small=ptmr at 8pt
\font\bla=ptmr at 10pt
\font\it=ptmri at 10pt
\bla
\input ovc-common
