% for pdftex
% page layout: no margins, exactly A4, no whitespace between lines
\hsize=210.2241038mm
\vsize=297.3017788mm
\hoffset=-1in
\voffset=-1in
\lineskip=0pt
\baselineskip=0pt
\parindent=0pt
\input graphicx % needed to input graphics..
\def\page#1{%
  \vfil
  \noindent
  \centerline{\includegraphics[width=21cm]{#1}}%
  \vfil
  \break
}%
